Princeton/BaBar/TNDC-97-57 R. Klemmer, C. Lu, K.T. McDonald and W.R. Sands April 29, 1997

Updated Plots of Drift Chamber Wire Creep

1 December 1996 Al Wire Improved by Annealing

Figure 1: Comparison of spool 28 of the CFW 80-¯m wire delivered in Dec. 1996, before and after annealing. See also, Princeton/BaBar/TNDC- 97-56.

2 Older Wire Shows Knee at 100-120 Days

Figure 2: CFW samples purchased in March 1996.

Figure 3: CFW samples purchased in Summer 1995.

Figure 4: CFW samples purchased in July 1996.

3 KEK Wire Shows Some Creep

Figure 5: KEK bare aluminum wire, 125 ¯m.